import { describe, it, expect, vi } from 'vitest';
import { fireEvent } from '@testing-library/react';
import { QueryClient, QueryClientProvider } from '@tanstack/react-query';

import OutboundsTab from '@/pages/xray/outbounds/OutboundsTab';
import type { XraySettingsValue } from '@/hooks/useXraySetting';

import { renderWithProviders } from './test-utils';

function settingsWithHiddenLoopback(): XraySettingsValue {
  return {
    outbounds: [
      { tag: 'proxy-a', protocol: 'vmess' },
      { tag: '_bl_bal1', protocol: 'loopback' },
      { tag: 'proxy-b', protocol: 'vmess' },
    ],
  } as unknown as XraySettingsValue;
}

describe('OutboundsTab hidden-loopback index mapping', () => {
  it('probes the outbound at its real array index, not the positional row index', () => {
    const onTest = vi.fn();
    const queryClient = new QueryClient({ defaultOptions: { queries: { retry: false } } });

    renderWithProviders(
      <QueryClientProvider client={queryClient}>
        <OutboundsTab
          templateSettings={settingsWithHiddenLoopback()}
          setTemplateSettings={vi.fn()}
          outboundsTraffic={[]}
          outboundTestStates={{}}
          subscriptionTestStates={{}}
          testingAll={false}
          inboundTags={[]}
          isMobile={false}
          onResetTraffic={vi.fn()}
          onTest={onTest}
          onTestSubscription={vi.fn()}
          onTestAll={vi.fn()}
          onShowWarp={vi.fn()}
          onShowNord={vi.fn()}
        />
      </QueryClientProvider>,
    );

    const tbody = document.querySelector('.ant-table-tbody');
    const tableRows = tbody?.querySelectorAll('tr.ant-table-row') ?? [];
    expect(tableRows.length).toBe(2);

    const checkButton = tableRows[1].querySelector('button[aria-label="Check"]') as HTMLButtonElement;
    fireEvent.click(checkButton);

    expect(onTest).toHaveBeenCalledTimes(1);
    expect(onTest.mock.calls[0][0]).toBe(2);
  });
});
